{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"ID","type":"number","width":11,"decimals":0},{"name":"SDBNAME","type":"character","width":24},{"name":"NUMBER","type":"number","width":11,"decimals":0},{"name":"TYPE","type":"number","width":11,"decimals":0},{"name":"SIZE","type":"number","width":11,"decimals":0},{"name":"PRODUCER","type":"character","width":8},{"name":"ATTRIBUTE","type":"number","width":11,"decimals":0},{"name":"VERSION","type":"number","width":11,"decimals":0},{"name":"TS1","type":"character","width":6},{"name":"TS2","type":"character","width":6}],"n_rows":9,"rows_kept":9,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[9,null,2000,2000,510,"STEP 7",2,4,"\u0002³¢\u0098%¬","\u0004ïm\u0080\u0012,"]
[8,null,1000,2002,370,"STEP 7",2,0,"\u0002³¢\u0098%¬","\u0004ïm\u0080\u0012,"]
[7,null,100,100,198,"STEP 7",2,0,"\u0002³¢\u0098%¬","\u0004ïm\u0080\u0012,"]
[6,null,7,7,138,"STEP 7",2,0,"\u0002³¢\u0098%¬","\u0004ïm\u0080\u0012,"]
[5,null,4,4,214,"STEP 7",2,0,"\u0002³¢\u0098%¬","\u0004ïm\u0080\u0012,"]
[4,null,3,3,166,"STEP 7",2,0,"\u0002³¢\u0098%¬","\u0004ïm\u0080\u0012,"]
[3,null,2,2,650,null,10,0,"\u000eE","\u000eE"]
[2,null,1,1,328,"STEP 7",2,0,"\u0002³¢\u0098%¬","\u0004ïm\u0080\u0012,"]
[1,null,0,0,300,"STEP 7",2,0,"\u0002³¢\u0098%¬","\u0004ïm\u0080\u0012,"]