{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"ID","type":"number","width":11,"decimals":0},{"name":"OBJTYP","type":"number","width":11,"decimals":0},{"name":"UNITID","type":"number","width":11,"decimals":0},{"name":"UNITTYP","type":"number","width":11,"decimals":0},{"name":"NAME","type":"character","width":80},{"name":"EXTOBJT","type":"number","width":11,"decimals":0},{"name":"CEXTTYPE","type":"character","width":250},{"name":"LASTID","type":"number","width":11,"decimals":0},{"name":"RSLOCK","type":"number","width":11,"decimals":0},{"name":"USLOCK","type":"number","width":11,"decimals":0},{"name":"UXLOCK","type":"number","width":11,"decimals":0},{"name":"DPSUBSN","type":"number","width":11,"decimals":0},{"name":"SUBSTATN","type":"number","width":11,"decimals":0},{"name":"MODULN","type":"number","width":11,"decimals":0},{"name":"SUBMODN","type":"number","width":11,"decimals":0},{"name":"OBJLEVEL","type":"number","width":11,"decimals":0},{"name":"CREATE","type":"character","width":10},{"name":"MODIFIED","type":"character","width":10}],"n_rows":5,"rows_kept":5,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[2,1315075,1,1314970,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0002t>d(¥","\u0002t>d(¥"]
[1,1314970,50,1122305,"SIMATIC 400(1)",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0002t>U(¥","\u0002t>U(¥"]
[5,1314972,3,1314969,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0002t¯ë(¥$","\u0002t¯ë(¥$"]
[4,1315075,3,1314969,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0002t£\u008c(¥","\u0002t£\u008c(¥"]
[3,1314969,50,1122305,"API_Process",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0002t£\u001f(¥","\u0002t£\u001f(¥"]